-- 仅建表 mes_xsl_manufacturer。完整初始化（厂家类别/是否有效字典、菜单、租户授权）请执行 mes-xsl-manufacturer-menu-permission.sql
SET NAMES utf8mb4;

CREATE TABLE IF NOT EXISTS `mes_xsl_manufacturer` (
  `id` varchar(32) NOT NULL COMMENT '主键',
  `manufacturer_category` varchar(32) NOT NULL COMMENT '厂家类别（字典xslmes_manufacturer_category：mold模具 capsule胶囊 equipment设备）',
  `manufacturer_name` varchar(128) NOT NULL COMMENT '厂家名称（同租户未删除数据中唯一）',
  `valid_status` varchar(1) NOT NULL DEFAULT '0' COMMENT '是否有效（字典xslmes_manufacturer_valid：0有效1无效）',
  `tenant_id` int DEFAULT NULL COMMENT '租户',
  `sys_org_code` varchar(64) DEFAULT NULL COMMENT '部门',
  `create_by` varchar(32) DEFAULT NULL COMMENT '创建人',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(32) DEFAULT NULL COMMENT '更新人',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `del_flag` int DEFAULT '0' COMMENT '删除标记（0正常1删除）',
  PRIMARY KEY (`id`),
  KEY `idx_mxm_tenant_name` (`tenant_id`, `manufacturer_name`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='MES厂家信息';
