-- 原材料检验项目（菜单与权限合并进 db/mes-material-menu.sql）
SET NAMES utf8mb4;

CREATE TABLE IF NOT EXISTS `mes_raw_material_inspect_item` (
  `id` varchar(32) NOT NULL COMMENT '主键',
  `inspect_item_name` varchar(200) NOT NULL COMMENT '检验项目名称',
  `inspect_item_name_en` varchar(200) DEFAULT NULL COMMENT '英文名称',
  `unit_name` varchar(64) DEFAULT NULL COMMENT '单位',
  `item_mark` varchar(100) DEFAULT NULL COMMENT '标记',
  `test_standard_no` varchar(128) DEFAULT NULL COMMENT '试验标准编号',
  `remark` varchar(500) DEFAULT NULL COMMENT '备注',
  `tenant_id` int DEFAULT NULL COMMENT '租户',
  `sys_org_code` varchar(64) DEFAULT NULL COMMENT '部门',
  `create_by` varchar(32) DEFAULT NULL COMMENT '创建人',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(32) DEFAULT NULL COMMENT '更新人',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `del_flag` int DEFAULT '0' COMMENT '删除标记',
  PRIMARY KEY (`id`),
  KEY `idx_rmii_name` (`inspect_item_name`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='MES原材料检验项目';
