-- 原材料检验标准（主表 + 子表）
SET NAMES utf8mb4;

CREATE TABLE IF NOT EXISTS `mes_raw_material_inspect_std` (
  `id` varchar(32) NOT NULL COMMENT '主键',
  `standard_no` varchar(64) NOT NULL COMMENT '标准编号',
  `mixer_material_id` varchar(32) NOT NULL COMMENT '密炼物料ID',
  `material_name` varchar(200) DEFAULT NULL COMMENT '物料名称',
  `material_desc` varchar(500) DEFAULT NULL COMMENT '物料描述',
  `material_kind` varchar(200) DEFAULT NULL COMMENT '种类',
  `version_no` varchar(64) DEFAULT NULL COMMENT '版本',
  `issue_no` varchar(64) DEFAULT NULL COMMENT '发行编号',
  `version_status` varchar(64) DEFAULT NULL COMMENT '版本状态',
  `enable_flag` int NOT NULL DEFAULT '0' COMMENT '启用标记：1启用 0停用',
  `effective_date` datetime DEFAULT NULL COMMENT '生效日期',
  `tenant_id` int DEFAULT NULL COMMENT '租户',
  `sys_org_code` varchar(64) DEFAULT NULL COMMENT '部门',
  `create_by` varchar(32) DEFAULT NULL COMMENT '创建人',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(32) DEFAULT NULL COMMENT '更新人',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `del_flag` int DEFAULT '0' COMMENT '删除标记',
  PRIMARY KEY (`id`),
  KEY `idx_rmis_std_no` (`standard_no`),
  KEY `idx_rmis_mixer` (`mixer_material_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='MES原材料检验标准';

CREATE TABLE IF NOT EXISTS `mes_raw_material_inspect_std_line` (
  `id` varchar(32) NOT NULL COMMENT '主键',
  `std_id` varchar(32) NOT NULL COMMENT '标准主表ID',
  `inspect_item_id` varchar(32) NOT NULL COMMENT '原材料检验项目ID',
  `inspect_item_name` varchar(200) DEFAULT NULL COMMENT '检验项目名称',
  `allow_min` decimal(24,6) DEFAULT NULL COMMENT '容许最小值',
  `include_min_flag` int NOT NULL DEFAULT '0' COMMENT '包含最小值：1是 0否',
  `allow_max` decimal(24,6) DEFAULT NULL COMMENT '容许最大值',
  `include_max_flag` int NOT NULL DEFAULT '0' COMMENT '包含最大值：1是 0否',
  `sort_no` int DEFAULT NULL COMMENT '排序',
  `create_by` varchar(32) DEFAULT NULL,
  `create_time` datetime DEFAULT NULL,
  `update_by` varchar(32) DEFAULT NULL,
  `update_time` datetime DEFAULT NULL,
  PRIMARY KEY (`id`),
  KEY `idx_rmisl_std` (`std_id`),
  KEY `idx_rmisl_item` (`inspect_item_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='MES原材料检验标准-检验项明细';
