-- 仅建表 mes_xsl_downtime_main_type。完整初始化请执行 mes-xsl-downtime-main-type-menu-permission.sql
SET NAMES utf8mb4;

CREATE TABLE IF NOT EXISTS `mes_xsl_downtime_main_type` (
  `id` varchar(32) NOT NULL COMMENT '主键',
  `process_operation_id` varchar(32) NOT NULL COMMENT '所属工序 mes_xsl_process_operation.id',
  `process_operation_name` varchar(500) DEFAULT NULL COMMENT '工序名称冗余',
  `downtime_type` varchar(500) NOT NULL COMMENT '停机类型（同租户未删除数据中唯一）',
  `display_order` int NOT NULL DEFAULT '0' COMMENT '显示顺序（升序）',
  `distinguish_color` varchar(500) DEFAULT NULL COMMENT '区分颜色（十六进制色值，如#1890ff）',
  `status` varchar(1) NOT NULL DEFAULT '0' COMMENT '是否启用（字典xslmes_downtime_main_type_status：0启用1停用）',
  `tenant_id` int DEFAULT NULL COMMENT '租户',
  `sys_org_code` varchar(500) DEFAULT NULL COMMENT '部门',
  `create_by` varchar(500) DEFAULT NULL COMMENT '创建人',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(500) DEFAULT NULL COMMENT '更新人',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `del_flag` int DEFAULT '0' COMMENT '删除标记（0正常1删除）',
  PRIMARY KEY (`id`),
  KEY `idx_mdmt_tenant_type` (`tenant_id`, `downtime_type`),
  KEY `idx_mdmt_process` (`process_operation_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='MES停机主类型';
