-- 仅建表：MES 设备小部位 mes_xsl_equipment_sub_part
-- 完整初始化（建表 + 菜单 + 租户授权）请执行 mes-xsl-equipment-sub-part-menu-permission.sql
SET NAMES utf8mb4;

CREATE TABLE IF NOT EXISTS `mes_xsl_equipment_sub_part` (
  `id` varchar(32) NOT NULL COMMENT '主键',
  `equipment_category_id` varchar(32) NOT NULL COMMENT '所属设备类别主键 mes_xsl_equipment_category.id',
  `equipment_category_name` varchar(128) DEFAULT NULL COMMENT '设备类别名称冗余展示',
  `equipment_part_id` varchar(32) NOT NULL COMMENT '所属设备大部位主键 mes_xsl_equipment_part.id',
  `equipment_part_name` varchar(128) DEFAULT NULL COMMENT '设备大部位名称冗余（mes_xsl_equipment_part.part_name）',
  `sub_part_name` varchar(128) NOT NULL COMMENT '小部位名称',
  `sub_part_code` varchar(64) NOT NULL COMMENT '小部位代码（同租户未删除数据中唯一）',
  `sub_part_description` varchar(500) DEFAULT NULL COMMENT '部位描述',
  `enable_status` varchar(1) NOT NULL DEFAULT '0' COMMENT '是否启用（字典xslmes_unit_status：0启用1停用）',
  `tenant_id` int DEFAULT NULL COMMENT '租户',
  `sys_org_code` varchar(64) DEFAULT NULL COMMENT '部门',
  `create_by` varchar(32) DEFAULT NULL COMMENT '创建人',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(32) DEFAULT NULL COMMENT '更新人',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `del_flag` int DEFAULT '0' COMMENT '删除标记（0正常1删除）',
  PRIMARY KEY (`id`),
  KEY `idx_mesp_tenant_subcode` (`tenant_id`, `sub_part_code`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='MES设备小部位';
