-- 仅建表：MES 设备类型 mes_xsl_equipment_type
-- 完整初始化（菜单、租户授权）请执行 mes-xsl-equipment-type-menu-permission.sql
SET NAMES utf8mb4;

CREATE TABLE IF NOT EXISTS `mes_xsl_equipment_type` (
  `id` varchar(32) NOT NULL COMMENT '主键',
  `type_name` varchar(128) NOT NULL COMMENT '设备类型名称',
  `process_operation_id` varchar(32) NOT NULL COMMENT '所属工序主键 mes_process_operation.id',
  `process_operation_name` varchar(128) DEFAULT NULL COMMENT '工序名称冗余展示',
  `equipment_category_id` varchar(32) NOT NULL COMMENT '所属设备类别主键 mes_xsl_equipment_category.id',
  `equipment_category_name` varchar(128) DEFAULT NULL COMMENT '设备类别名称冗余展示',
  `tenant_id` int DEFAULT NULL COMMENT '租户',
  `sys_org_code` varchar(64) DEFAULT NULL COMMENT '部门',
  `create_by` varchar(32) DEFAULT NULL COMMENT '创建人',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(32) DEFAULT NULL COMMENT '更新人',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `del_flag` int DEFAULT '0' COMMENT '删除标记（0正常1删除）',
  PRIMARY KEY (`id`),
  KEY `idx_met_tenant_typename` (`tenant_id`, `type_name`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='MES设备类型';
