-- 仅建表：MES 备品件类别 mes_xsl_spare_parts_category
-- 完整初始化（建表 + 菜单 + 租户授权）请执行 mes-xsl-spare-parts-category-menu-permission.sql
SET NAMES utf8mb4;

CREATE TABLE IF NOT EXISTS `mes_xsl_spare_parts_category` (
  `id` varchar(32) NOT NULL COMMENT '主键',
  `category_name` varchar(128) NOT NULL COMMENT '类别名称（同租户未删除数据中唯一）',
  `category_description` varchar(500) DEFAULT NULL COMMENT '描述',
  `tenant_id` int DEFAULT NULL COMMENT '租户',
  `sys_org_code` varchar(64) DEFAULT NULL COMMENT '部门',
  `create_by` varchar(32) DEFAULT NULL COMMENT '创建人',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_by` varchar(32) DEFAULT NULL COMMENT '更新人',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `del_flag` int DEFAULT '0' COMMENT '删除标记（0正常1删除）',
  PRIMARY KEY (`id`),
  KEY `idx_mspc_tenant_catname` (`tenant_id`, `category_name`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='MES备品件类别';
